30 32 34 36 38 40 42 44 46 48 50 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 sweep (39.40, 0.57408)

mono (39.41, 0.35569)

------FRF------

30 32 34 36 38 40 42 44 46 48 50

-3.5 -3 -2.5 -2 -1.5 -1 -0.5 0

Freq [Hz]