0 2 4 6 8 0 0.1 0.2 0.3 0.4 0.5 0.6 m= 0.0 g, f_0= 122.0 Hz

V [V_{RMS}]

P [mW]

0 2 4 6 8 0 0.1 0.2 0.3 0.4 0.5 m= 2.4 g, f_0= 75.0 Hz

V [V_{RMS}]

0 5 10 15 20 0 1 2 3 4 m= 7.8 g, f_0= 50.6 Hz

V [V_{RMS}]

0 5 10 15 20 0 1 2 3 4 5 m= 15.6 g, f_0= 39.4 Hz

V [V_{RMS}]